BASICS:
The MAIN MENU is operated by pressing each of the push -
buttons. This can be done either by pressing the High -
lighted letter key, or by clicking the LEFT Mouse Button.
To EXIT any window, such as this one, Click the spacebar
Icon button in the upper left corner. You may also use
the ESCAPE key to EXIT...

MENUS:
Sub Menus otherwise can simultaneously use 3 different
methods of user interface. You may use whichever is most
comfortable:
1 >         Click the text with the mouse.
2 > Move the lightbar with the cursor keys, Press ENTER.
3 >         Press a Highlighted letter key.

HELP:
Help is available at most functions and menus by clicking
HELP or by pressing the '?' key.

PUSHBUTTONS:
At any time during operation, note the status of any push
buttons on screen. The MAIN MENU is actually FIVE buttons
at the top of the screen. If a button is pressed in, you
may not press other buttons... It needs to be released.To
release, press the spacebar Icon in the upper left of a
window, or press ESCAPE.

EXITING:
To EXIT from Collect!, choose FILE. Choose QUIT...

OPEN A FILE:
Otherwise, the first order of business is to open a DATA
FILE. There are some examples supplied. EXIT this HELP,
Choose FILE | OPEN. The current default filename is dis-
played. Choose LIST to see a list of the available data
files. More help is available at that point...

